806040

CFC-113 (ppt)

25020015010050CFC-11 (ppt)

500400300

CFC-12 (ppt)

1800

1600

1400

1200

CH

4

(ppb)

300250200

N

2

O (ppb)

0.300.250.200.280.260.240.220.220.200.180.160.14

Correlation Slope (% of Tropospheric Mixing Ratio per ppt of CFC-11)

0.250.200.15Figure 7a

Observations local correlation slope quadratic fit to slopes fit uncertainty range